-- Modbus e2e smoke seed — v3 schema (Raw tree: DriverInstance → Device → Tag; UNS by reference).
--
-- Idempotent — DELETE-and-recreate of one cluster's worth of Modbus test config:
--   * 1 ServerCluster ('modbus-smoke') + ClusterNode ('modbus-smoke-node') + SqlLogin credential
--   * 1 Modbus DriverInstance at the cluster root (RawFolderId NULL)
--   * 1 Device carrying the pymodbus endpoint in DeviceConfig
--   * 1 Tag at HR[200]:UInt16 under the device (HR[100] is auto-increment in standard.json,
--     unusable as a write target — the e2e script uses HR[200] for that reason)
--   * 1 UnsArea/UnsLine/Equipment + a UnsTagReference projecting the raw tag into UNS
--
-- v3 changes vs. the pre-v2 original: the ConfigGeneration/GenerationId/Namespace model and the
-- sp_PublishGeneration publish step are gone (deploy is a C# ControlPlane operation now); the
-- connection endpoint moved from DriverConfig into the Device's DeviceConfig.
--
-- Usage:
--   sqlcmd -S "10.100.0.35,14330" -d <cfgdb> -U sa -P "<pw>" -i scripts/smoke/seed-modbus-smoke.sql

SET NOCOUNT ON;
SET XACT_ABORT ON;
SET QUOTED_IDENTIFIER ON;
SET ANSI_NULLS ON;

DECLARE @ClusterId nvarchar(64) = 'modbus-smoke';
DECLARE @NodeId    nvarchar(64) = 'modbus-smoke-node';
DECLARE @DrvId     nvarchar(64) = 'modbus-smoke-drv';
DECLARE @DevId     nvarchar(64) = 'modbus-smoke-dev';
DECLARE @AreaId    nvarchar(64) = 'modbus-smoke-area';
DECLARE @LineId    nvarchar(64) = 'modbus-smoke-line';
DECLARE @EqId      nvarchar(64) = 'modbus-smoke-eq';
DECLARE @EqUuid    uniqueidentifier = '72BD5A10-72BD-45A1-B72B-D5A1072BD5A1';
DECLARE @TagHr200  nvarchar(64) = 'modbus-smoke-tag-hr200';
DECLARE @RefId     nvarchar(64) = 'modbus-smoke-ref-hr200';

BEGIN TRAN;

-- Clean prior smoke state (child rows first).
DELETE FROM dbo.UnsTagReference       WHERE UnsTagReferenceId = @RefId;
DELETE FROM dbo.Tag                   WHERE TagId = @TagHr200;
DELETE FROM dbo.Equipment             WHERE EquipmentId = @EqId;
DELETE FROM dbo.UnsLine               WHERE UnsLineId = @LineId;
DELETE FROM dbo.UnsArea               WHERE UnsAreaId = @AreaId;
DELETE FROM dbo.Device                WHERE DeviceId = @DevId;
DELETE FROM dbo.DriverInstance        WHERE DriverInstanceId = @DrvId;
DELETE FROM dbo.ClusterNodeCredential WHERE NodeId = @NodeId;
DELETE FROM dbo.ClusterNode           WHERE NodeId = @NodeId;
DELETE FROM dbo.ServerCluster         WHERE ClusterId = @ClusterId;

-- `UX_ClusterNodeCredential_Value` is a unique index on (Kind, Value) WHERE Enabled=1, so the
-- `sa` login can only bind to one node at a time. Drop any prior smoke binding first.
DELETE FROM dbo.ClusterNodeCredential WHERE Kind = 'SqlLogin' AND Value = 'sa';

-- 1. Cluster + Node + credential binding.
INSERT dbo.ServerCluster(ClusterId, Name, Enterprise, Site, NodeCount, RedundancyMode, Enabled, CreatedBy)
VALUES (@ClusterId, 'Modbus Smoke', 'zb', 'lab', 1, 'None', 1, 'modbus-smoke');

INSERT dbo.ClusterNode(NodeId, ClusterId, Host, OpcUaPort, DashboardPort,
                       ApplicationUri, ServiceLevelBase, Enabled, CreatedBy)
VALUES (@NodeId, @ClusterId, 'localhost', 4840, 15050,
        'urn:OtOpcUa:modbus-smoke-node', 200, 1, 'modbus-smoke');

INSERT dbo.ClusterNodeCredential(NodeId, Kind, Value, Enabled, CreatedBy)
VALUES (@NodeId, 'SqlLogin', 'sa', 1, 'modbus-smoke');

-- 2. Modbus DriverInstance at the cluster root (RawFolderId NULL). DriverConfig keeps protocol/
--    channel settings only — the endpoint (Host/Port/UnitId) now lives in the Device's DeviceConfig.
INSERT dbo.DriverInstance(DriverInstanceId, ClusterId, RawFolderId, Name, DriverType, DriverConfig, Enabled)
VALUES (@DrvId, @ClusterId, NULL, 'pymodbus-smoke', 'Modbus', N'{
  "TimeoutMs": 2000,
  "AutoReconnect": true,
  "Probe": { "Enabled": true, "IntervalMs": 5000, "TimeoutMs": 2000, "ProbeAddress": 0 }
}', 1);

-- 3. Device — endpoint. DeviceConfig shape finalized against reworked options in Wave B (WP5).
INSERT dbo.Device(DeviceId, DriverInstanceId, Name, Enabled, DeviceConfig)
VALUES (@DevId, @DrvId, 'plc', 1, N'{ "Host": "127.0.0.1", "Port": 5020, "UnitId": 1 }');

-- 4. Raw tag under the device (identity = RawPath; TagConfig carries the driver address only).
INSERT dbo.Tag(TagId, DeviceId, TagGroupId, Name, DataType, AccessLevel, WriteIdempotent, TagConfig)
VALUES (@TagHr200, @DevId, NULL, 'HR200', 'UInt16', 'ReadWrite', 1,
        N'{ "region": "HoldingRegisters", "address": 200, "dataType": "UInt16", "writable": true }');

-- 5. UNS hierarchy + a reference projecting the raw tag into the equipment.
INSERT dbo.UnsArea(UnsAreaId, ClusterId, Name)          VALUES (@AreaId, @ClusterId, 'lab-floor');
INSERT dbo.UnsLine(UnsLineId, UnsAreaId, Name)          VALUES (@LineId, @AreaId, 'modbus-line');
INSERT dbo.Equipment(EquipmentId, EquipmentUuid, UnsLineId, Name, MachineCode, Enabled)
VALUES (@EqId, @EqUuid, @LineId, 'modbus-sim', 'modbus-001', 1);

INSERT dbo.UnsTagReference(UnsTagReferenceId, EquipmentId, TagId, SortOrder)
VALUES (@RefId, @EqId, @TagHr200, 0);

COMMIT;

PRINT '';
PRINT 'Modbus smoke seed complete (v3 schema).';
PRINT '  Cluster: ' + @ClusterId + '  Node: ' + @NodeId;
PRINT '';
PRINT 'Next steps:';
PRINT '  1. Set Server appsettings Node:NodeId = "modbus-smoke-node" / Node:ClusterId = "modbus-smoke"';
PRINT '  2. docker compose -f tests/.../Modbus.IntegrationTests/Docker/docker-compose.yml --profile standard up -d';
PRINT '  3. dotnet run --project src/Server/ZB.MOM.WW.OtOpcUa.Server';
PRINT '  4. Deploy the config via the AdminUI/ControlPlane, then ./scripts/e2e/test-modbus.ps1';
