-- AB Legacy e2e smoke seed — closes #213 (umbrella #209).
--
-- Hardware-gated. The ab_server PCCC dispatcher is upstream-broken (task #222
-- tracks the lab rig + alternative fixtures), so verifying this seed end-to-end
-- requires real SLC 500 / MicroLogix / PLC-5 hardware or an RSEmulate 500
-- golden-box. The factory + seed ship here so the wiring is in place the
-- moment real hardware becomes available — no server code changes needed.
--
-- Usage (once hardware is reachable):
--   sqlcmd -S "localhost,14330" -d OtOpcUaConfig -U sa -P "OtOpcUaDev_2026!" \
--          -i scripts/smoke/seed-ablegacy-smoke.sql
-- (Update the `HostAddress` below to point at the real gateway first.)

SET NOCOUNT ON;
SET XACT_ABORT ON;
SET QUOTED_IDENTIFIER ON;
SET ANSI_NULLS ON;
SET ANSI_PADDING ON;
SET ANSI_WARNINGS ON;
SET ARITHABORT ON;
SET CONCAT_NULL_YIELDS_NULL ON;

DECLARE @ClusterId nvarchar(64) = 'ablegacy-smoke';
DECLARE @NodeId    nvarchar(64) = 'ablegacy-smoke-node';
DECLARE @DrvId     nvarchar(64) = 'ablegacy-smoke-drv';
DECLARE @NsId      nvarchar(64) = 'ablegacy-smoke-ns';
DECLARE @AreaId    nvarchar(64) = 'ablegacy-smoke-area';
DECLARE @LineId    nvarchar(64) = 'ablegacy-smoke-line';
DECLARE @EqId      nvarchar(64) = 'ablegacy-smoke-eq';
DECLARE @EqUuid    uniqueidentifier = '5A1D2030-5A1D-4203-A5A1-D20305A1D203';
DECLARE @TagId     nvarchar(64) = 'ablegacy-smoke-tag-n7_5';

BEGIN TRAN;

DELETE FROM dbo.Tag                        WHERE TagId IN (@TagId);
DELETE FROM dbo.Equipment                  WHERE EquipmentId = @EqId;
DELETE FROM dbo.UnsLine                    WHERE UnsLineId = @LineId;
DELETE FROM dbo.UnsArea                    WHERE UnsAreaId = @AreaId;
DELETE FROM dbo.DriverInstance             WHERE DriverInstanceId = @DrvId;
DELETE FROM dbo.Namespace                  WHERE NamespaceId = @NsId;
DELETE FROM dbo.ConfigGeneration           WHERE ClusterId = @ClusterId;
DELETE FROM dbo.ClusterNodeCredential      WHERE NodeId = @NodeId;
DELETE FROM dbo.ClusterNodeGenerationState WHERE NodeId = @NodeId;
DELETE FROM dbo.ClusterNode                WHERE NodeId = @NodeId;
DELETE FROM dbo.ServerCluster              WHERE ClusterId = @ClusterId;

INSERT dbo.ServerCluster(ClusterId, Name, Enterprise, Site, NodeCount, RedundancyMode, Enabled, CreatedBy)
VALUES (@ClusterId, 'AB Legacy Smoke', 'zb', 'lab', 1, 'None', 1, 'ablegacy-smoke');

INSERT dbo.ClusterNode(NodeId, ClusterId, RedundancyRole, Host, OpcUaPort, DashboardPort,
                       ApplicationUri, ServiceLevelBase, Enabled, CreatedBy)
VALUES (@NodeId, @ClusterId, 'Primary', 'localhost', 4840, 5000,
        'urn:OtOpcUa:ablegacy-smoke-node', 200, 1, 'ablegacy-smoke');

DECLARE @Gen bigint;
INSERT dbo.ConfigGeneration(ClusterId, Status, CreatedBy)
VALUES (@ClusterId, 'Draft', 'ablegacy-smoke');
SET @Gen = SCOPE_IDENTITY();

INSERT dbo.Namespace(GenerationId, NamespaceId, ClusterId, Kind, NamespaceUri, Enabled)
VALUES (@Gen, @NsId, @ClusterId, 'Equipment', 'urn:ablegacy-smoke:eq', 1);

INSERT dbo.UnsArea(GenerationId, UnsAreaId, ClusterId, Name)
VALUES (@Gen, @AreaId, @ClusterId, 'lab-floor');

INSERT dbo.UnsLine(GenerationId, UnsLineId, UnsAreaId, Name)
VALUES (@Gen, @LineId, @AreaId, 'ablegacy-line');

INSERT dbo.Equipment(GenerationId, EquipmentId, EquipmentUuid, DriverInstanceId, UnsLineId,
                     Name, MachineCode, Enabled)
VALUES (@Gen, @EqId, @EqUuid, @DrvId, @LineId, 'slc-sim', 'ablegacy-001', 1);

-- AB Legacy DriverInstance — SLC 500 target. Replace the placeholder gateway
-- `192.168.1.10` with the real PLC / RSEmulate host before running.
INSERT dbo.DriverInstance(GenerationId, DriverInstanceId, ClusterId, NamespaceId,
                          Name, DriverType, DriverConfig, Enabled)
VALUES (@Gen, @DrvId, @ClusterId, @NsId, 'ablegacy-smoke', 'AbLegacy', N'{
  "TimeoutMs": 2000,
  "Devices": [
    {
      "HostAddress": "ab://192.168.1.10/1,0",
      "PlcFamily": "Slc500",
      "DeviceName": "slc-500"
    }
  ],
  "Probe": { "Enabled": true, "IntervalMs": 5000, "TimeoutMs": 2000, "ProbeAddress": "S:0" },
  "Tags": [
    {
      "Name": "N7_5",
      "DeviceHostAddress": "ab://192.168.1.10/1,0",
      "Address": "N7:5",
      "DataType": "Int",
      "Writable": true,
      "WriteIdempotent": true
    }
  ]
}', 1);

INSERT dbo.Tag(GenerationId, TagId, DriverInstanceId, EquipmentId, Name, DataType,
               AccessLevel, TagConfig, WriteIdempotent)
VALUES (@Gen, @TagId, @DrvId, @EqId, 'N7_5', 'Int16', 'ReadWrite',
        N'{"FullName":"N7_5","Address":"N7:5","DataType":"Int"}', 1);

EXEC dbo.sp_PublishGeneration @ClusterId = @ClusterId, @DraftGenerationId = @Gen,
                              @Notes = N'AB Legacy smoke — task #213';

COMMIT;

PRINT '';
PRINT 'AB Legacy smoke seed complete.';
PRINT '  Cluster:    ' + @ClusterId;
PRINT '  Node:       ' + @NodeId;
PRINT '  Generation: ' + CONVERT(nvarchar(20), @Gen);
PRINT '';
PRINT 'NOTE: hardware-gated. ab_server PCCC is upstream-broken (#222). Point the';
PRINT '      DriverConfig HostAddress at real SLC / MicroLogix / PLC-5 / RSEmulate';
PRINT '      and run the e2e script with AB_LEGACY_TRUST_WIRE=1.';
